-- The UDP auto-log path was filling the non-standard `rig` and `ant`
-- columns (intended for the contacted station's rig/antenna, rarely
-- used) instead of `my_rig` / `my_antenna` (the official ADIF MY_RIG /
-- MY_ANTENNA fields). Move any data that's already there to the right
-- column when the standard one is empty — then clear the non-standard
-- fields so the QSOs match what should have been logged.

UPDATE qso
   SET my_rig = rig
 WHERE (my_rig IS NULL OR my_rig = '')
   AND rig IS NOT NULL AND rig != '';

UPDATE qso
   SET my_antenna = ant
 WHERE (my_antenna IS NULL OR my_antenna = '')
   AND ant IS NOT NULL AND ant != '';

UPDATE qso SET rig = '' WHERE rig IS NOT NULL AND rig != '';
UPDATE qso SET ant = '' WHERE ant IS NOT NULL AND ant != '';
