-- Per-profile logbook database. Each profile can target its own logbook:
-- the local SQLite file, or a specific shared MySQL database. Switching the
-- active profile switches the logbook accordingly. Stored as a small JSON
-- document {backend, host, port, user, password, database}; empty = inherit
-- the default (local SQLite).
ALTER TABLE station_profiles ADD COLUMN db_config TEXT NOT NULL DEFAULT '';
